\documentclass[conference]{IEEEtran}

\title{Your Guardian: Simulation-First AI Risk Prediction for Home Safety}

\author{\IEEEauthorblockN{Your Guardian Research Team}
\IEEEauthorblockA{Your Guardian Lab\\
Remote\\
contact: your-guardian@bgcode.tech}}

\begin{document}
\maketitle

\begin{abstract}
Your Guardian is an AI safety platform that forecasts household risks such as electrical faults, water leaks, fire, gas, and air quality hazards. This paper presents a simulation-first methodology that produces labeled risk trajectories before large-scale hardware deployments. The approach unifies multi-domain sensor streams, calibrates a unified risk score, and generates predictive timelines to guide preventative action.
\end{abstract}

\begin{IEEEkeywords}
home safety, risk prediction, IoT, anomaly detection, sensor fusion
\end{IEEEkeywords}

\section{Introduction}
Household incidents often arise from gradual degradation that goes unnoticed until failure occurs. Your Guardian aims to detect these signals early and deliver actionable forecasts. A simulation-first strategy accelerates research before costly field deployments, while maintaining a direct path to real-world sensor integration.

\section{System Architecture}
The platform is designed around a modular pipeline: sensor ingestion, data normalization, risk modeling, and visualization. Simulation data and live sensor streams share the same schema to ensure the user interface and prediction logic remain stable as deployments scale.

\section{Data and Simulation}
A synthetic data engine generates time-series signals for electrical load, voltage instability, water flow, gas concentration, temperature, and humidity. Normal patterns are blended with anomaly injections to create labeled risk windows. These labeled sequences enable early experimentation with prediction horizons and alert thresholds.

\section{Risk Prediction Model}
The system combines temporal feature windows with anomaly detection and sequence modeling to estimate risk trajectories. The model outputs a unified risk score along with domain-specific sub-scores for electrical, water, fire, gas, and air quality. Explainability layers map high-risk predictions to the dominant sensor signals.

\section{Implementation}
A lightweight gateway ingests sensor data over MQTT or REST, then streams signals to the risk engine. The prediction service exposes scores through an API consumed by the dashboard. The same interface supports simulation data during the prototype phase and live data during pilots.

\section{Evaluation Plan}
Field pilots will validate precision, recall, and alert timing. Pilot deployments will compare model predictions with manual inspections and recorded incidents. Thresholds will be calibrated to minimize false positives while preserving early warning capability.

\section{Conclusion and Future Work}
Your Guardian demonstrates that simulation-first training can deliver investor-ready safety intelligence while preparing for real-world deployments. Future work includes certified sensor hardware, expanded datasets, and deeper integrations with insurance and smart home platforms.

\begin{thebibliography}{1}
\bibitem{ref1} A. Author, ``IoT-based home safety monitoring,'' \emph{Journal of Smart Systems}, 2023.
\bibitem{ref2} B. Author, ``Anomaly detection for sensor fusion,'' \emph{Proceedings of AI Safety}, 2022.
\end{thebibliography}

\end{document}
